% !TEX encoding = UTF-8
% !TEX program = pdflatex
% !TEX spellcheck = en_GB

\documentclass[greek,a4paper]{europasscv}

\ecvname{Μαρία Μάντζιου}
\ecvaddress{Ελεούσα, Ιωάννινα}
\ecvtelephone[+44 7123456789]{+44 20123456789}
\ecvemail{ma12454@uoi.gr}
\ecvhomepage{https://pleiades.math.uoi.gr/~ma12454}
%\ecvim{AOL Messenger}{betty.smith}
%\ecvim{Google Talk}{bsmith}

\ecvdateofbirth{22 September 2001}
\ecvnationality{Greek}
\ecvgender{female}

% \ecvpicture[width=3.8cm]{picture.jpg}

\begin{document}
  \begin{europasscv}

  \ecvpersonalinfo

  %\ecvbigitem{Job applied for}{European project manager}

  \ecvsection{Εργασιακή Εμπειρία}
  
  
  \ecvitem{}{Since 2022,I give private lessons to children.}
  
  \ecvtitle{-}{Internship}
  \ecvitem{}{I still haven't had my internship,but I am open to any internship opportunities that is related to Mathematics,Business Administration,Economy or Project Management.I'm eager to contribute effectively to team projects and collaborate with other distinguished people in order to find solutions in real life problems and to achieve handling complex tasks.}
  \ecvitem{}{
  \begin{ecvitemize}
  \item
  \end{ecvitemize}
  }
  
  
  
  \ecvsection{Διδακτική Εμπειρία}
  
  \ecvsection{Εκπαίδευση και Κατάρτιση}
  
  \ecvtitle{Graduate of High School} 
  \ecvitem{}{Currently studying at University of Ioannina}
  
  \ecvtitle{2019- Now}{Bachelor of Mathematics}
  \ecvitem{}{University of Ioannina, Greece}
  \ecvitem{}{
      \begin{ecvitemize}
	\item mathematical analysis
	\item algebra and geometry
	\item statistics and operational research
	\item applied and computational mathematics
      \end{ecvitemize}
  }
  
% \pagebreak
  
  \ecvsection{Γλωσσικές Δεξιότητες}
  \ecvmothertongue{Greek}
  \ecvlanguageheader
  \ecvlanguage{English}{C1}{C2}{B2}{B1}{A2}{A1}
  \ecvlanguage{Italian}{A1}{A2}
  \ecvlanguage{French}{A1}{mostly able to study French and understand it due to my knowledge of Spanish}	  
  \ecvlastlanguage{Spanish}{B2}
  
  \ecvlanguagefooter
  
  \ecvsection{Προσωπικές Δεξιότητες}
  \ecvblueitem{Ικανότητα Επικοινωνίας}{
  \begin{ecvitemize}
    \item team work: I have worked in various types of team projects especially during school times.I love participating in team projects,where everyone share their ideas and then we are all making our research on the topic given.The biggest group project I've ever participated in, was a group project organised by my Computer Science teacher in school,when we were about to host another group of Lithuanian students. The theme of the project was "Culture and Civilisation" and our goal was to present our country and city,our culture and educational system.Due to my great knowledge of English, I took on a large part of the project, and lastly I presented it.
	    "Social Networking" to me is a very significant sector not only in work, but in daily life.I always choose to communicate efficiently, to be kind and to listen to others carefully, so as I can share effectively my thoughts and ideas.I am proficient in using social media to connect with others,stay informed on current events and share personal insights.When I get a job I aspire to leverage social networks to build professional relationships, collaborate on projects and stay updated on industry trends, helping to enhance communication and drive success.
  \end{ecvitemize}
  }
  
  \ecvblueitem{Οργανωτικές Δεξιότητες}{
  \begin{ecvitemize}
    \item I'm a very organised and consistent person.I always organise my time and information in order to get the best result possible.I work well under difficult circumstances, however the truth is that I enjoy working under no pressure, because I believe I perform better. 
  \end{ecvitemize}
  }
  
  \ecvblueitem{Ψηφιακές Δεξιότητες}{
  \begin{ecvitemize}
    \item competent with most Microsoft Office programmes
    \item experience with HTML
  \end{ecvitemize}
  }
  
  
  \ecvblueitem{Αλλες Δεξιότητες}{During my free time,as every other person, I love hanging out with my friends or spending time wiht my family, however I mostly prefer doing things by myself in order to improve myself at all levels.To start with, enjoy hitting the gym.In fact I firmly believe that when the body's healthy and sane, the mind is as well.That's why almost every afternoon I'm either taking pilates lessons, aerobic or running by the lake.I also enjoy spending time strolling around the city and shopping.Most of my spare time is spent quietly in my house. In fact, my favourite habit, since I was six years old, is reading extracurricular books.A habit I got from my dad, which helps me improve my mental health,my thoughts,and of course the languages I speak, since I prefer reading foreign language books.For the exact reason I binge watch movies and series in other languages to enrich my knowledge and speak as fluent as possible.Last but not least,I adore traveling both inside and outside of the country,visiting sights, museums,new places and experiencing different cultures,lifestyles,people,cuisines, etc.}

  \ecvblueitem{Driving licence}{A}
  
  \end{europasscv}

\end{document}
