\begin{thebibliography}{1}

\bibitem{ovren84}
C.~Ovrén, M.~Adolfsson, and B.~Hök.
\newblock Fiber-optic systems for temperature and vibration measurements in
  industrial applications.
\newblock 5(3):155--172, 1984.

\bibitem{ross16}
David Ross-Pinnock and Paul~G Maropoulos.
\newblock Review of industrial temperature measurement technologies and
  research priorities for the thermal characterisation of the factories of the
  future.
\newblock {\em Proceedings of the Institution of Mechanical Engineers, Part B:
  Journal of Engineering Manufacture}, 230(5):793--806, 2016.
\newblock Publisher: {IMECHE}.

\end{thebibliography}
